% mitgreek.tex 1.1 -- use CMMI for upper-case Greek letters
%  (1) more consistent and (2) works when no greek in \rm font

\mathchardef\Gamma	= "7100
\mathchardef\Delta	= "7101
\mathchardef\Theta	= "7102
\mathchardef\Lambda	= "7103
\mathchardef\Xi		= "7104
\mathchardef\Pi		= "7105
\mathchardef\Sigma	= "7106
\mathchardef\Upsilon	= "7107
\mathchardef\Phi	= "7108
\mathchardef\Psi	= "7109
\mathchardef\Omega	= "710A
