% Tex file for generating the reloadpdf.pdf utility to force Adobe Reader
% to reload all currently loaded documents. Usage:
%
% pdflatex reloadpdf
% acroread reloadpdf.pdf
%
\documentclass{article}
\begin{document}
\ \pdfannot width 0pt height 0pt { /AA << /PO << /S /JavaScript /JS
  (try{reload();} catch(e) {} closeDoc(this);) >> >> }
\end{document}
