\documentclass{article}
\usepackage[mouseover]{ocgtools}
\begin{document}
\section{Test}
This is a \ocgminitextrt{OCG layer test}{Test Test
Test}

\newpage
\section{Second page}
The OCGtools does not (yet) work well on PDF files consistion from one page.
\end{document}