\documentclass{article}
\usepackage[pdftex,
panelleft,
screen]{pdfscreen}

\margins{0.25in}{0.25in}{0.25in}{0.25in} %left,right,top,bot
%\screensize{6in}{8in}
\screensize{4.875in}{6.5in}

%\usepackage{times}

\usepackage[transparent=0.9,
nobutton, nopageclose, fixcolor
]{ocgtools}

\input ocgtools-test.tex
\end{document}
