%%%%
\catcode`\{=1 \catcode`\}=2
\pdfoutput=1 \pdfcompresslevel=0 \pdfobjcompresslevel=0
\pdfglyphtounicode{space}{0020}
\pdfinterwordspaceon
\font\x=cmr10 \x \hsize=4in \vsize=4in
\noindent abc cde\hfil
\end
%%%%